Bunch Polarization: LPOL precision

5-minutes average!

POL2000-LPOL group: LPOL Performance - 1 -

Bunch Polarization: LPOL precision

5-minutes average!

POL2000-LPOL group: LPOL Performance - 2 -

Monitoring the LPOL Measurements

Alternating measurements with Crystal and SW calorimeters

POL2000-LPOL group: LPOL Performance - 3 -

Monitoring the LPOL Measurements

Considering all the periods together:

1-minute average CR and SW in agreement within 3%!

POL2000-LPOL group: LPOL Performance - 4 -

Monitoring the LPOL Measurements

Further measurements with SW

POL2000-LPOL group: LPOL Performance - 5 -

Monitoring the LPOL Measurements

CR and SW in agreement within 2%! SW systematics to be determined comparing CR & SW without TPOL reference (=⇒ Stable Pol.!)

POL2000-LPOL group: LPOL Performance - 6 -